import FooterSimpleMedia from '@/components/sections/footer/FooterSimpleMedia';
import NavbarFloating from '@/components/ui/NavbarFloating';
import SectionErrorBoundary from "@/components/ui/SectionErrorBoundary";
import SiteBackgroundSlot from "@/components/ui/SiteBackgroundSlot";
import { Outlet } from 'react-router-dom';
import { StyleProvider } from "@/components/ui/StyleProvider";

export default function Layout() {
  const navItems = [
  {
    "name": "Home",    "href": "#hero"
  },
  {
    "name": "About",    "href": "#about"
  },
  {
    "name": "Services",    "href": "#services"
  },
  {
    "name": "Contatti",    "href": "#contact"
  },
  {
    "name": "Why Us",    "href": "#why-us"
  },
  {
    "name": "Team",    "href": "#team"
  },
  {
    "name": "Testimonials",    "href": "#testimonials"
  }
];

  return (
    <StyleProvider buttonVariant="stagger" siteBackground="noiseGradient" heroBackground="lightRaysCorner">
      <SiteBackgroundSlot />
      <SectionErrorBoundary name="navbar">
        <NavbarFloating
      logo="Clima Service"
      ctaButton={{
        text: "Richiedi Preventivo",        href: "#contact"}}
     navItems={navItems} />
      </SectionErrorBoundary>
      <main className="flex-grow">
        <Outlet />
      </main>
      <SectionErrorBoundary name="footer">
        <FooterSimpleMedia
      brand="Clima Service"
      columns={[
        {
          title: "Informazioni",          items: [
            {
              label: "Chi Siamo",              href: "#about"},
            {
              label: "Servizi",              href: "#services"},
            {
              label: "Privacy Policy",              href: "#"},
          ],
        },
        {
          title: "Contatti",          items: [
            {
              label: "Telefono: +39 000 000 000",              href: "tel:+39000000000"},
            {
              label: "Email: info@climaservice.it",              href: "mailto:info@climaservice.it"},
            {
              label: "Sede: Milano, Italia",              href: "#"},
          ],
        },
      ]}
      copyright="© 2024 Clima Service. Tutti i diritti riservati."
      links={[]}
      imageSrc="http://img.b2bpic.net/free-photo/meticulous-wiremen-expertly-refilling-freon-external-air-conditioner-while-using-manifold-measurement-device-closely-measure-pressure-hvac-system-ensuring-perfect-cooling-performance_482257-68069.jpg?_wi=1"
    />
      </SectionErrorBoundary>
    </StyleProvider>
  );
}
