import FooterSimple from '@/components/sections/footer/FooterSimple';
import NavbarInline from '@/components/ui/NavbarInline';
import SectionErrorBoundary from "@/components/ui/SectionErrorBoundary";
import SiteBackgroundSlot from "@/components/ui/SiteBackgroundSlot";
import { Outlet } from 'react-router-dom';
import { StyleProvider } from "@/components/ui/StyleProvider";

export default function Layout() {
  const navItems = [
  {
    "name": "Inicio",
    "href": "#hero"
  },
  {
    "name": "Servicios",
    "href": "#services"
  },
  {
    "name": "Opiniones",
    "href": "#testimonials"
  },
  {
    "name": "Contacto",
    "href": "#contact"
  },
  {
    "name": "About",
    "href": "#about"
  },
  {
    "name": "Metrics",
    "href": "#metrics"
  },
  {
    "name": "Faq",
    "href": "#faq"
  }
];

  return (
    <StyleProvider buttonVariant="stagger" siteBackground="gridDots" heroBackground="lightRaysCenter">
      <SiteBackgroundSlot />
      <SectionErrorBoundary name="navbar">
        <NavbarInline
      logo="Clínica Del Pie"
      ctaButton={{
        text: "Cita Previa",
        href: "#contact",
      }}
     navItems={navItems} />
      </SectionErrorBoundary>
      <main className="flex-grow">
        <Outlet />
      </main>
      <SectionErrorBoundary name="footer">
        <FooterSimple
      brand="Clínica Del Pie Callosa"
      columns={[
        {
          title: "Clínica",
          items: [
            {
              label: "Sobre nosotros",
              href: "#about",
            },
            {
              label: "Servicios",
              href: "#services",
            },
            {
              label: "Contacto",
              href: "#contact",
            },
          ],
        },
        {
          title: "Legal",
          items: [
            {
              label: "Política de Privacidad",
              href: "#",
            },
            {
              label: "Aviso Legal",
              href: "#",
            },
          ],
        },
      ]}
      copyright="© 2024 Clínica del Pie Callosa de Segura. Todos los derechos reservados."
      links={[
        {
          label: "Privacidad",
          href: "#",
        },
        {
          label: "Términos",
          href: "#",
        },
      ]}
    />
      </SectionErrorBoundary>
    </StyleProvider>
  );
}
